LIBRARY HeliosLaserDAC
EXPORTS
	OLSC_GetAPIVersion
	OLSC_GetDeviceCapabilities
	OLSC_GetDeviceCount
	OLSC_GetInterfaceName
	OLSC_GetLastErrorNumber
	OLSC_GetStatus
	OLSC_Initialize
	OLSC_Pause
	OLSC_Play
	OLSC_ReadDMX
	OLSC_ReadTTL
	OLSC_SetCallback
	OLSC_Shutdown
	OLSC_Shutter
	OLSC_WriteDMX
	OLSC_WriteFrame
	OLSC_WriteFrameEx
	OLSC_WriteTTL
	
